+ wide_help                      5     21
+ narrow_help                   27     10
+ multipage_help                38     45
~wide_help

This is a wide help window resulting from the fact that the help text
entered for help label "wide_help" (this text) was entered using the
full screen.





Notice

how

blank

lines

can

be mixed in with the help text.

~narrow_help

This help window
is very skinny
because the help
window is 
automagically
sized to fit
the longest
help line.

~multipage_help

This help screen will spill over to a 2nd page

b
e
c
a
u
s
e

I
'
m

e
n
t
e
r
i
n
g

l
i
n
e
s

o
f

t
e
x
t

t
o

take up space.



